/*
   Add custom ops to the end.
*/
DEF_OP(CUSTOM_SOFTMAX)
DEF_OP(CUSTOM_AINR_DENOISE_POSTPROCESS)
DEF_OP(CUSTOM_WARP_AFFINE)
DEF_OP(CUSTOM_WARP_PERSPECTIVE)
DEF_OP(CUSTOM_SAMPLE)
